NCUTW-J-J-D-03

Summary Statistics Run ID NCUTW-J-J-D-03 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 31000 Relevant: 2151 Rel-ret: 1543

Summary Statistics Run ID NCUTW-J-J-D-03 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 31000 Relevant: 3294 Rel-ret: 2374

Recall Level Precision Averages

Recall Precision 0.00 0.3469 0.10 0.2315 0.20 0.1936 0.30 0.1730 0.40 0.1553 0.50 0.1431 0.60 0.1203 0.70 0.1003 0.80 0.0761 0.90 0.0480 1.00 0.0158 Average precision over all relevant documents non-interpolated 0.1348

Document Level Averages Precision At 5 docs 0.2240 At 10 docs 0.2100 At 15 docs 0.1907 At 20 docs 0.1960 At 30 docs 0.1780 At 100 docs 0.1282 At 200 docs 0.0970 At 500 docs 0.0540 At 1000 docs 0.0309 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1519

Recall Level Precision Averages

Recall Precision 0.00 0.4643 0.10 0.3157 0.20 0.2682 0.30 0.2400 0.40 0.2156 0.50 0.1947 0.60 0.1642 0.70 0.1414 0.80 0.1037 0.90 0.0612 1.00 0.0167 Average precision over all relevant documents non-interpolated 0.1888

Document Level Averages Precision At 5 docs 0.3440 At 10 docs 0.3120 At 15 docs 0.2853 At 20 docs 0.2830 At 30 docs 0.2647 At 100 docs 0.1960 At 200 docs 0.1489 At 500 docs 0.0831 At 1000 docs 0.0475 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2002

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)