AINLP-C-J-D-02

Summary Statistics Run ID AINLP-C-J-D-02 Task C-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 49999 Relevant: 3180 Rel-ret: 1169

Summary Statistics Run ID AINLP-C-J-D-02 Task C-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 49999 Relevant: 4764 Rel-ret: 1637

Recall Level Precision Averages

Recall Precision 0.00 0.2875 0.10 0.1389 0.20 0.0959 0.30 0.0753 0.40 0.0610 0.50 0.0489 0.60 0.0389 0.70 0.0296 0.80 0.0220 0.90 0.0168 1.00 0.0014 Average precision over all relevant documents non-interpolated 0.0619

Document Level Averages Precision At 5 docs 0.1480 At 10 docs 0.1460 At 15 docs 0.1280 At 20 docs 0.1220 At 30 docs 0.1107 At 100 docs 0.0782 At 200 docs 0.0604 At 500 docs 0.0367 At 1000 docs 0.0234 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.0916

Recall Level Precision Averages

Recall Precision 0.00 0.3573 0.10 0.1824 0.20 0.1275 0.30 0.1037 0.40 0.0890 0.50 0.0702 0.60 0.0573 0.70 0.0458 0.80 0.0314 0.90 0.0254 1.00 0.0019 Average precision over all relevant documents non-interpolated 0.0851

Document Level Averages Precision At 5 docs 0.2120 At 10 docs 0.2040 At 15 docs 0.1773 At 20 docs 0.1680 At 30 docs 0.1513 At 100 docs 0.1102 At 200 docs 0.0864 At 500 docs 0.0524 At 1000 docs 0.0327 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1195

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)