AINLP-C-J-T-01

Summary Statistics Run ID AINLP-C-J-T-01 Task C-J Relevant Level Level1 (S or A) Method automatic Query Field T Query Type T only Number of Topics 50 Total number of documents over all topics Retrieved: 42997 Relevant: 2609 Rel-ret: 1188

Summary Statistics Run ID AINLP-C-J-T-01 Task C-J Relevant Level Level2 (S, A, or B) Method automatic Query Field T Query Type T only Number of Topics 50 Total number of documents over all topics Retrieved: 42997 Relevant: 4044 Rel-ret: 1731

Recall Level Precision Averages

Recall Precision 0.00 0.3380 0.10 0.1852 0.20 0.1395 0.30 0.1195 0.40 0.0930 0.50 0.0834 0.60 0.0556 0.70 0.0407 0.80 0.0356 0.90 0.0301 1.00 0.0084 Average precision over all relevant documents non-interpolated 0.0904

Document Level Averages Precision At 5 docs 0.1800 At 10 docs 0.1600 At 15 docs 0.1467 At 20 docs 0.1400 At 30 docs 0.1313 At 100 docs 0.0976 At 200 docs 0.0714 At 500 docs 0.0406 At 1000 docs 0.0238 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1142

Recall Level Precision Averages

Recall Precision 0.00 0.4184 0.10 0.2104 0.20 0.1712 0.30 0.1399 0.40 0.1132 0.50 0.0890 0.60 0.0703 0.70 0.0578 0.80 0.0537 0.90 0.0443 1.00 0.0139 Average precision over all relevant documents non-interpolated 0.1092

Document Level Averages Precision At 5 docs 0.2400 At 10 docs 0.2160 At 15 docs 0.2027 At 20 docs 0.1980 At 30 docs 0.1833 At 100 docs 0.1364 At 200 docs 0.1011 At 500 docs 0.0580 At 1000 docs 0.0346 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1408

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (T only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (T only)