BRKLY-J-C-D-03

Summary Statistics Run ID BRKLY-J-C-D-03 Task J-C Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2598 Rel-ret: 952

Summary Statistics Run ID BRKLY-J-C-D-03 Task J-C Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4405 Rel-ret: 1559

Recall Level Precision Averages

Recall Precision 0.00 0.2486 0.10 0.1437 0.20 0.1224 0.30 0.1095 0.40 0.0808 0.50 0.0688 0.60 0.0592 0.70 0.0480 0.80 0.0377 0.90 0.0282 1.00 0.0102 Average precision over all relevant documents non-interpolated 0.0770

Document Level Averages Precision At 5 docs 0.1360 At 10 docs 0.1080 At 15 docs 0.1000 At 20 docs 0.0990 At 30 docs 0.0960 At 100 docs 0.0706 At 200 docs 0.0527 At 500 docs 0.0315 At 1000 docs 0.0190 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.0914

Recall Level Precision Averages

Recall Precision 0.00 0.3111 0.10 0.1921 0.20 0.1596 0.30 0.1394 0.40 0.1195 0.50 0.1031 0.60 0.0852 0.70 0.0691 0.80 0.0546 0.90 0.0397 1.00 0.0119 Average precision over all relevant documents non-interpolated 0.1061

Document Level Averages Precision At 5 docs 0.2120 At 10 docs 0.1740 At 15 docs 0.1653 At 20 docs 0.1550 At 30 docs 0.1507 At 100 docs 0.1112 At 200 docs 0.0846 At 500 docs 0.0519 At 1000 docs 0.0312 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1282

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)