HUM-J-J-D-03

Summary Statistics Run ID HUM-J-J-D-03 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3180 Rel-ret: 2178

Summary Statistics Run ID HUM-J-J-D-03 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4764 Rel-ret: 3278

Recall Level Precision Averages

Recall Precision 0.00 0.6264 0.10 0.3735 0.20 0.3070 0.30 0.2684 0.40 0.2364 0.50 0.2101 0.60 0.1783 0.70 0.1522 0.80 0.1265 0.90 0.0833 1.00 0.0381 Average precision over all relevant documents non-interpolated 0.2152

Document Level Averages Precision At 5 docs 0.3800 At 10 docs 0.3400 At 15 docs 0.3000 At 20 docs 0.2800 At 30 docs 0.2633 At 100 docs 0.1892 At 200 docs 0.1420 At 500 docs 0.0752 At 1000 docs 0.0436 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2427

Recall Level Precision Averages

Recall Precision 0.00 0.7364 0.10 0.4795 0.20 0.4167 0.30 0.3508 0.40 0.3033 0.50 0.2709 0.60 0.2240 0.70 0.1932 0.80 0.1589 0.90 0.1120 1.00 0.0432 Average precision over all relevant documents non-interpolated 0.2779

Document Level Averages Precision At 5 docs 0.4840 At 10 docs 0.4440 At 15 docs 0.4267 At 20 docs 0.4000 At 30 docs 0.3780 At 100 docs 0.2726 At 200 docs 0.2089 At 500 docs 0.1137 At 1000 docs 0.0656 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3079

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)