HUM-J-J-D-05

Summary Statistics Run ID HUM-J-J-D-05 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3180 Rel-ret: 2190

Summary Statistics Run ID HUM-J-J-D-05 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4764 Rel-ret: 3315

Recall Level Precision Averages

Recall Precision 0.00 0.5826 0.10 0.3697 0.20 0.3363 0.30 0.2944 0.40 0.2640 0.50 0.2310 0.60 0.2027 0.70 0.1621 0.80 0.1221 0.90 0.0891 1.00 0.0450 Average precision over all relevant documents non-interpolated 0.2261

Document Level Averages Precision At 5 docs 0.4120 At 10 docs 0.3420 At 15 docs 0.3000 At 20 docs 0.2790 At 30 docs 0.2593 At 100 docs 0.1918 At 200 docs 0.1413 At 500 docs 0.0806 At 1000 docs 0.0438 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2491

Recall Level Precision Averages

Recall Precision 0.00 0.6832 0.10 0.4735 0.20 0.4248 0.30 0.3561 0.40 0.3198 0.50 0.2804 0.60 0.2442 0.70 0.1962 0.80 0.1562 0.90 0.1164 1.00 0.0420 Average precision over all relevant documents non-interpolated 0.2841

Document Level Averages Precision At 5 docs 0.5320 At 10 docs 0.4680 At 15 docs 0.4147 At 20 docs 0.4010 At 30 docs 0.3787 At 100 docs 0.2740 At 200 docs 0.2055 At 500 docs 0.1208 At 1000 docs 0.0663 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2985

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)