I2R-C-C-D-01

Summary Statistics Run ID I2R-C-C-D-01 Task C-C Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2598 Rel-ret: 2147

Summary Statistics Run ID I2R-C-C-D-01 Task C-C Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4405 Rel-ret: 3700

Recall Level Precision Averages

Recall Precision 0.00 0.6901 0.10 0.5877 0.20 0.5123 0.30 0.4434 0.40 0.3694 0.50 0.3140 0.60 0.2604 0.70 0.2036 0.80 0.1461 0.90 0.0832 1.00 0.0237 Average precision over all relevant documents non-interpolated 0.3136

Document Level Averages Precision At 5 docs 0.4560 At 10 docs 0.4620 At 15 docs 0.4453 At 20 docs 0.4020 At 30 docs 0.3673 At 100 docs 0.2226 At 200 docs 0.1494 At 500 docs 0.0771 At 1000 docs 0.0429 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3458

Recall Level Precision Averages

Recall Precision 0.00 0.8566 0.10 0.7211 0.20 0.6232 0.30 0.5442 0.40 0.4816 0.50 0.4047 0.60 0.3450 0.70 0.2712 0.80 0.2055 0.90 0.1302 1.00 0.0196 Average precision over all relevant documents non-interpolated 0.4071

Document Level Averages Precision At 5 docs 0.6680 At 10 docs 0.6660 At 15 docs 0.6400 At 20 docs 0.5880 At 30 docs 0.5413 At 100 docs 0.3612 At 200 docs 0.2507 At 500 docs 0.1316 At 1000 docs 0.0740 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.4249

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)