IASL-K-C-D-01

Summary Statistics Run ID IASL-K-C-D-01 Task K-C Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2598 Rel-ret: 1328

Summary Statistics Run ID IASL-K-C-D-01 Task K-C Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4405 Rel-ret: 2119

Recall Level Precision Averages

Recall Precision 0.00 0.3454 0.10 0.2214 0.20 0.1753 0.30 0.1357 0.40 0.1126 0.50 0.0881 0.60 0.0692 0.70 0.0529 0.80 0.0462 0.90 0.0273 1.00 0.0084 Average precision over all relevant documents non-interpolated 0.1022

Document Level Averages Precision At 5 docs 0.1960 At 10 docs 0.1560 At 15 docs 0.1520 At 20 docs 0.1380 At 30 docs 0.1313 At 100 docs 0.1002 At 200 docs 0.0718 At 500 docs 0.0421 At 1000 docs 0.0266 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1331

Recall Level Precision Averages

Recall Precision 0.00 0.4477 0.10 0.2678 0.20 0.1991 0.30 0.1633 0.40 0.1452 0.50 0.1167 0.60 0.0889 0.70 0.0682 0.80 0.0543 0.90 0.0337 1.00 0.0084 Average precision over all relevant documents non-interpolated 0.1274

Document Level Averages Precision At 5 docs 0.2720 At 10 docs 0.2300 At 15 docs 0.2173 At 20 docs 0.2060 At 30 docs 0.2000 At 100 docs 0.1534 At 200 docs 0.1109 At 500 docs 0.0669 At 1000 docs 0.0424 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1760

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)