JSCCL-J-J-D-04

Summary Statistics Run ID JSCCL-J-J-D-04 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 49108 Relevant: 3180 Rel-ret: 2322

Summary Statistics Run ID JSCCL-J-J-D-04 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 49108 Relevant: 4764 Rel-ret: 3470

Recall Level Precision Averages

Recall Precision 0.00 0.6668 0.10 0.4261 0.20 0.3719 0.30 0.3233 0.40 0.2658 0.50 0.2295 0.60 0.2038 0.70 0.1820 0.80 0.1461 0.90 0.0940 1.00 0.0411 Average precision over all relevant documents non-interpolated 0.2450

Document Level Averages Precision At 5 docs 0.3600 At 10 docs 0.3540 At 15 docs 0.3387 At 20 docs 0.3140 At 30 docs 0.2827 At 100 docs 0.2060 At 200 docs 0.1528 At 500 docs 0.0825 At 1000 docs 0.0464 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2678

Recall Level Precision Averages

Recall Precision 0.00 0.8200 0.10 0.5425 0.20 0.4733 0.30 0.4022 0.40 0.3489 0.50 0.3073 0.60 0.2663 0.70 0.2309 0.80 0.1812 0.90 0.1316 1.00 0.0553 Average precision over all relevant documents non-interpolated 0.3206

Document Level Averages Precision At 5 docs 0.5480 At 10 docs 0.5120 At 15 docs 0.4947 At 20 docs 0.4590 At 30 docs 0.4167 At 100 docs 0.3062 At 200 docs 0.2273 At 500 docs 0.1231 At 1000 docs 0.0694 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3453

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)