KLE-J-J-D-02

Summary Statistics Run ID KLE-J-J-D-02 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3180 Rel-ret: 2354

Summary Statistics Run ID KLE-J-J-D-02 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4764 Rel-ret: 3429

Recall Level Precision Averages

Recall Precision 0.00 0.5853 0.10 0.3868 0.20 0.3321 0.30 0.3056 0.40 0.2756 0.50 0.2567 0.60 0.2246 0.70 0.1950 0.80 0.1562 0.90 0.1165 1.00 0.0502 Average precision over all relevant documents non-interpolated 0.2429

Document Level Averages Precision At 5 docs 0.3480 At 10 docs 0.3380 At 15 docs 0.3147 At 20 docs 0.2960 At 30 docs 0.2740 At 100 docs 0.2062 At 200 docs 0.1536 At 500 docs 0.0834 At 1000 docs 0.0471 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2549

Recall Level Precision Averages

Recall Precision 0.00 0.7385 0.10 0.5140 0.20 0.4442 0.30 0.4065 0.40 0.3574 0.50 0.3262 0.60 0.2875 0.70 0.2463 0.80 0.1886 0.90 0.1352 1.00 0.0498 Average precision over all relevant documents non-interpolated 0.3151

Document Level Averages Precision At 5 docs 0.4880 At 10 docs 0.4620 At 15 docs 0.4387 At 20 docs 0.4220 At 30 docs 0.3940 At 100 docs 0.2970 At 200 docs 0.2226 At 500 docs 0.1206 At 1000 docs 0.0686 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3272

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)