NCUTW-C-C-D-03

Summary Statistics Run ID NCUTW-C-C-D-03 Task C-C Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 30000 Relevant: 1347 Rel-ret: 1057

Summary Statistics Run ID NCUTW-C-C-D-03 Task C-C Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 30000 Relevant: 2310 Rel-ret: 1805

Recall Level Precision Averages

Recall Precision 0.00 0.2642 0.10 0.1798 0.20 0.1445 0.30 0.1231 0.40 0.1121 0.50 0.0936 0.60 0.0768 0.70 0.0588 0.80 0.0467 0.90 0.0327 1.00 0.0091 Average precision over all relevant documents non-interpolated 0.0937

Document Level Averages Precision At 5 docs 0.1440 At 10 docs 0.1520 At 15 docs 0.1440 At 20 docs 0.1410 At 30 docs 0.1320 At 100 docs 0.0928 At 200 docs 0.0664 At 500 docs 0.0367 At 1000 docs 0.0211 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1202

Recall Level Precision Averages

Recall Precision 0.00 0.3898 0.10 0.2699 0.20 0.2233 0.30 0.1817 0.40 0.1615 0.50 0.1394 0.60 0.1165 0.70 0.0934 0.80 0.0660 0.90 0.0494 1.00 0.0144 Average precision over all relevant documents non-interpolated 0.1433

Document Level Averages Precision At 5 docs 0.2600 At 10 docs 0.2500 At 15 docs 0.2307 At 20 docs 0.2260 At 30 docs 0.2073 At 100 docs 0.1490 At 200 docs 0.1095 At 500 docs 0.0616 At 1000 docs 0.0361 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1703

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)