NCUTW-C-C-D-04

Summary Statistics Run ID NCUTW-C-C-D-04 Task C-C Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 30000 Relevant: 1347 Rel-ret: 1159

Summary Statistics Run ID NCUTW-C-C-D-04 Task C-C Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 30000 Relevant: 2310 Rel-ret: 2021

Recall Level Precision Averages

Recall Precision 0.00 0.3288 0.10 0.2487 0.20 0.2046 0.30 0.1826 0.40 0.1506 0.50 0.1317 0.60 0.1188 0.70 0.1001 0.80 0.0811 0.90 0.0585 1.00 0.0246 Average precision over all relevant documents non-interpolated 0.1370

Document Level Averages Precision At 5 docs 0.1960 At 10 docs 0.1840 At 15 docs 0.1760 At 20 docs 0.1720 At 30 docs 0.1587 At 100 docs 0.1148 At 200 docs 0.0831 At 500 docs 0.0422 At 1000 docs 0.0232 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1544

Recall Level Precision Averages

Recall Precision 0.00 0.4354 0.10 0.3443 0.20 0.2889 0.30 0.2533 0.40 0.2196 0.50 0.1989 0.60 0.1811 0.70 0.1560 0.80 0.1298 0.90 0.0966 1.00 0.0305 Average precision over all relevant documents non-interpolated 0.2031

Document Level Averages Precision At 5 docs 0.3240 At 10 docs 0.2920 At 15 docs 0.2813 At 20 docs 0.2690 At 30 docs 0.2527 At 100 docs 0.1904 At 200 docs 0.1425 At 500 docs 0.0736 At 1000 docs 0.0404 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2100

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)