NCUTW-J-J-D-04

Summary Statistics Run ID NCUTW-J-J-D-04 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 31000 Relevant: 2151 Rel-ret: 1633

Summary Statistics Run ID NCUTW-J-J-D-04 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 31000 Relevant: 3294 Rel-ret: 2533

Recall Level Precision Averages

Recall Precision 0.00 0.3423 0.10 0.2706 0.20 0.2212 0.30 0.1958 0.40 0.1788 0.50 0.1612 0.60 0.1457 0.70 0.1281 0.80 0.1015 0.90 0.0717 1.00 0.0278 Average precision over all relevant documents non-interpolated 0.1574

Document Level Averages Precision At 5 docs 0.2200 At 10 docs 0.2100 At 15 docs 0.2107 At 20 docs 0.2030 At 30 docs 0.1933 At 100 docs 0.1452 At 200 docs 0.1071 At 500 docs 0.0586 At 1000 docs 0.0327 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1635

Recall Level Precision Averages

Recall Precision 0.00 0.4201 0.10 0.3465 0.20 0.3008 0.30 0.2553 0.40 0.2385 0.50 0.2231 0.60 0.2027 0.70 0.1778 0.80 0.1419 0.90 0.0994 1.00 0.0356 Average precision over all relevant documents non-interpolated 0.2162

Document Level Averages Precision At 5 docs 0.3320 At 10 docs 0.3160 At 15 docs 0.3040 At 20 docs 0.2920 At 30 docs 0.2813 At 100 docs 0.2170 At 200 docs 0.1639 At 500 docs 0.0900 At 1000 docs 0.0507 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2166

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)