NICT-E-K-D-03

Summary Statistics Run ID NICT-E-K-D-03 Task E-K Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2280 Rel-ret: 1659

Summary Statistics Run ID NICT-E-K-D-03 Task E-K Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4518 Rel-ret: 3220

Recall Level Precision Averages

Recall Precision 0.00 0.4985 0.10 0.4071 0.20 0.3664 0.30 0.3233 0.40 0.2921 0.50 0.2708 0.60 0.2285 0.70 0.2020 0.80 0.1738 0.90 0.1348 1.00 0.0904 Average precision over all relevant documents non-interpolated 0.2531

Document Level Averages Precision At 5 docs 0.3080 At 10 docs 0.3080 At 15 docs 0.2867 At 20 docs 0.2740 At 30 docs 0.2447 At 100 docs 0.1658 At 200 docs 0.1170 At 500 docs 0.0595 At 1000 docs 0.0332 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2643

Recall Level Precision Averages

Recall Precision 0.00 0.6476 0.10 0.5340 0.20 0.4720 0.30 0.4268 0.40 0.3735 0.50 0.3345 0.60 0.2909 0.70 0.2465 0.80 0.1998 0.90 0.1392 1.00 0.0722 Average precision over all relevant documents non-interpolated 0.3257

Document Level Averages Precision At 5 docs 0.4760 At 10 docs 0.4700 At 15 docs 0.4507 At 20 docs 0.4430 At 30 docs 0.4113 At 100 docs 0.2946 At 200 docs 0.2106 At 500 docs 0.1118 At 1000 docs 0.0644 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3387

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)