NICT-E-K-D-05

Summary Statistics Run ID NICT-E-K-D-05 Task E-K Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2280 Rel-ret: 1707

Summary Statistics Run ID NICT-E-K-D-05 Task E-K Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4518 Rel-ret: 3319

Recall Level Precision Averages

Recall Precision 0.00 0.5961 0.10 0.4712 0.20 0.4202 0.30 0.3894 0.40 0.3470 0.50 0.3135 0.60 0.2631 0.70 0.2364 0.80 0.1911 0.90 0.1266 1.00 0.0790 Average precision over all relevant documents non-interpolated 0.2915

Document Level Averages Precision At 5 docs 0.3600 At 10 docs 0.3580 At 15 docs 0.3347 At 20 docs 0.3090 At 30 docs 0.2827 At 100 docs 0.1808 At 200 docs 0.1217 At 500 docs 0.0603 At 1000 docs 0.0341 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3081

Recall Level Precision Averages

Recall Precision 0.00 0.7243 0.10 0.6041 0.20 0.5434 0.30 0.4919 0.40 0.4378 0.50 0.3898 0.60 0.3438 0.70 0.2938 0.80 0.2275 0.90 0.1481 1.00 0.0616 Average precision over all relevant documents non-interpolated 0.3736

Document Level Averages Precision At 5 docs 0.5280 At 10 docs 0.5280 At 15 docs 0.5133 At 20 docs 0.4950 At 30 docs 0.4647 At 100 docs 0.3340 At 200 docs 0.2274 At 500 docs 0.1163 At 1000 docs 0.0664 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3927

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)