NICT-J-J-D-02

Summary Statistics Run ID NICT-J-J-D-02 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3180 Rel-ret: 2478

Summary Statistics Run ID NICT-J-J-D-02 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4764 Rel-ret: 3683

Recall Level Precision Averages

Recall Precision 0.00 0.5579 0.10 0.4281 0.20 0.3801 0.30 0.3417 0.40 0.3094 0.50 0.2839 0.60 0.2547 0.70 0.2224 0.80 0.1842 0.90 0.1243 1.00 0.0514 Average precision over all relevant documents non-interpolated 0.2680

Document Level Averages Precision At 5 docs 0.3440 At 10 docs 0.3300 At 15 docs 0.3253 At 20 docs 0.3220 At 30 docs 0.3067 At 100 docs 0.2284 At 200 docs 0.1634 At 500 docs 0.0876 At 1000 docs 0.0496 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2852

Recall Level Precision Averages

Recall Precision 0.00 0.7051 0.10 0.5722 0.20 0.4929 0.30 0.4436 0.40 0.4048 0.50 0.3720 0.60 0.3264 0.70 0.2802 0.80 0.2304 0.90 0.1637 1.00 0.0536 Average precision over all relevant documents non-interpolated 0.3532

Document Level Averages Precision At 5 docs 0.5200 At 10 docs 0.5000 At 15 docs 0.4720 At 20 docs 0.4530 At 30 docs 0.4327 At 100 docs 0.3264 At 200 docs 0.2400 At 500 docs 0.1305 At 1000 docs 0.0737 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3618

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)