OASIS-C-J-D-04

Summary Statistics Run ID OASIS-C-J-D-04 Task C-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3180 Rel-ret: 1157

Summary Statistics Run ID OASIS-C-J-D-04 Task C-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4764 Rel-ret: 1721

Recall Level Precision Averages

Recall Precision 0.00 0.2614 0.10 0.1288 0.20 0.0944 0.30 0.0711 0.40 0.0574 0.50 0.0465 0.60 0.0260 0.70 0.0152 0.80 0.0059 0.90 0.0045 1.00 0.0024 Average precision over all relevant documents non-interpolated 0.0537

Document Level Averages Precision At 5 docs 0.1280 At 10 docs 0.1080 At 15 docs 0.0987 At 20 docs 0.0930 At 30 docs 0.0920 At 100 docs 0.0684 At 200 docs 0.0507 At 500 docs 0.0332 At 1000 docs 0.0231 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.0798

Recall Level Precision Averages

Recall Precision 0.00 0.3294 0.10 0.1508 0.20 0.1075 0.30 0.0833 0.40 0.0604 0.50 0.0435 0.60 0.0287 0.70 0.0140 0.80 0.0075 0.90 0.0045 1.00 0.0007 Average precision over all relevant documents non-interpolated 0.0596

Document Level Averages Precision At 5 docs 0.1560 At 10 docs 0.1380 At 15 docs 0.1320 At 20 docs 0.1260 At 30 docs 0.1233 At 100 docs 0.0970 At 200 docs 0.0753 At 500 docs 0.0500 At 1000 docs 0.0344 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.1027

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)