OKSAT-J-J-D-01

Summary Statistics Run ID OKSAT-J-J-D-01 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 48458 Relevant: 3180 Rel-ret: 2271

Summary Statistics Run ID OKSAT-J-J-D-01 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 48458 Relevant: 4764 Rel-ret: 3337

Recall Level Precision Averages

Recall Precision 0.00 0.5502 0.10 0.3471 0.20 0.2921 0.30 0.2430 0.40 0.2177 0.50 0.1919 0.60 0.1446 0.70 0.1114 0.80 0.0838 0.90 0.0497 1.00 0.0109 Average precision over all relevant documents non-interpolated 0.1851

Document Level Averages Precision At 5 docs 0.3360 At 10 docs 0.3040 At 15 docs 0.2880 At 20 docs 0.2750 At 30 docs 0.2580 At 100 docs 0.1846 At 200 docs 0.1363 At 500 docs 0.0772 At 1000 docs 0.0454 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2231

Recall Level Precision Averages

Recall Precision 0.00 0.7055 0.10 0.4518 0.20 0.3680 0.30 0.3137 0.40 0.2772 0.50 0.2423 0.60 0.1867 0.70 0.1496 0.80 0.1078 0.90 0.0645 1.00 0.0134 Average precision over all relevant documents non-interpolated 0.2397

Document Level Averages Precision At 5 docs 0.4720 At 10 docs 0.4280 At 15 docs 0.4053 At 20 docs 0.3890 At 30 docs 0.3653 At 100 docs 0.2666 At 200 docs 0.1965 At 500 docs 0.1122 At 1000 docs 0.0667 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2802

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)