UniNE-J-J-D-05

Summary Statistics Run ID UniNE-J-J-D-05 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3180 Rel-ret: 2693

Summary Statistics Run ID UniNE-J-J-D-05 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4764 Rel-ret: 3929

Recall Level Precision Averages

Recall Precision 0.00 0.6692 0.10 0.4336 0.20 0.3903 0.30 0.3599 0.40 0.3244 0.50 0.3020 0.60 0.2551 0.70 0.2218 0.80 0.1858 0.90 0.1288 1.00 0.0636 Average precision over all relevant documents non-interpolated 0.2834

Document Level Averages Precision At 5 docs 0.3960 At 10 docs 0.3700 At 15 docs 0.3560 At 20 docs 0.3360 At 30 docs 0.3093 At 100 docs 0.2298 At 200 docs 0.1727 At 500 docs 0.0952 At 1000 docs 0.0539 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2917

Recall Level Precision Averages

Recall Precision 0.00 0.7790 0.10 0.5690 0.20 0.5000 0.30 0.4476 0.40 0.4085 0.50 0.3673 0.60 0.3168 0.70 0.2768 0.80 0.2169 0.90 0.1479 1.00 0.0589 Average precision over all relevant documents non-interpolated 0.3589

Document Level Averages Precision At 5 docs 0.5720 At 10 docs 0.5380 At 15 docs 0.5000 At 20 docs 0.4700 At 30 docs 0.4353 At 100 docs 0.3294 At 200 docs 0.2478 At 500 docs 0.1382 At 1000 docs 0.0786 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3628

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)