UniNE-J-J-T-04

Summary Statistics Run ID UniNE-J-J-T-04 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field T Query Type T only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3180 Rel-ret: 2738

Summary Statistics Run ID UniNE-J-J-T-04 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field T Query Type T only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4764 Rel-ret: 4096

Recall Level Precision Averages

Recall Precision 0.00 0.6812 0.10 0.4993 0.20 0.4243 0.30 0.3899 0.40 0.3467 0.50 0.3199 0.60 0.2734 0.70 0.2310 0.80 0.1883 0.90 0.1282 1.00 0.0619 Average precision over all relevant documents non-interpolated 0.3031

Document Level Averages Precision At 5 docs 0.4640 At 10 docs 0.4300 At 15 docs 0.4053 At 20 docs 0.3790 At 30 docs 0.3507 At 100 docs 0.2564 At 200 docs 0.1852 At 500 docs 0.0961 At 1000 docs 0.0548 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3237

Recall Level Precision Averages

Recall Precision 0.00 0.8441 0.10 0.6477 0.20 0.5394 0.30 0.4699 0.40 0.4228 0.50 0.3766 0.60 0.3264 0.70 0.2730 0.80 0.2133 0.90 0.1440 1.00 0.0523 Average precision over all relevant documents non-interpolated 0.3751

Document Level Averages Precision At 5 docs 0.6560 At 10 docs 0.5980 At 15 docs 0.5600 At 20 docs 0.5240 At 30 docs 0.4893 At 100 docs 0.3664 At 200 docs 0.2674 At 500 docs 0.1427 At 1000 docs 0.0819 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3827

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (T only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (T only)