UniNE-K-K-D-02

Summary Statistics Run ID UniNE-K-K-D-02 Task K-K Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2280 Rel-ret: 2068

Summary Statistics Run ID UniNE-K-K-D-02 Task K-K Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4518 Rel-ret: 3981

Recall Level Precision Averages

Recall Precision 0.00 0.8370 0.10 0.7075 0.20 0.6070 0.30 0.5705 0.40 0.5225 0.50 0.4715 0.60 0.4262 0.70 0.3734 0.80 0.3074 0.90 0.2263 1.00 0.1450 Average precision over all relevant documents non-interpolated 0.4535

Document Level Averages Precision At 5 docs 0.6200 At 10 docs 0.5480 At 15 docs 0.4853 At 20 docs 0.4540 At 30 docs 0.4020 At 100 docs 0.2432 At 200 docs 0.1587 At 500 docs 0.0760 At 1000 docs 0.0414 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.4342

Recall Level Precision Averages

Recall Precision 0.00 0.9414 0.10 0.7905 0.20 0.7242 0.30 0.6702 0.40 0.6151 0.50 0.5613 0.60 0.5024 0.70 0.4420 0.80 0.3560 0.90 0.2592 1.00 0.1272 Average precision over all relevant documents non-interpolated 0.5375

Document Level Averages Precision At 5 docs 0.8120 At 10 docs 0.7440 At 15 docs 0.7053 At 20 docs 0.6720 At 30 docs 0.6287 At 100 docs 0.4300 At 200 docs 0.2933 At 500 docs 0.1448 At 1000 docs 0.0796 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.5156

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)