UniNE-K-K-D-04

Summary Statistics Run ID UniNE-K-K-D-04 Task K-K Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2280 Rel-ret: 2066

Summary Statistics Run ID UniNE-K-K-D-04 Task K-K Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4518 Rel-ret: 3958

Recall Level Precision Averages

Recall Precision 0.00 0.7924 0.10 0.6797 0.20 0.6051 0.30 0.5452 0.40 0.5067 0.50 0.4531 0.60 0.4122 0.70 0.3609 0.80 0.2953 0.90 0.2075 1.00 0.1313 Average precision over all relevant documents non-interpolated 0.4362

Document Level Averages Precision At 5 docs 0.5760 At 10 docs 0.5160 At 15 docs 0.4760 At 20 docs 0.4390 At 30 docs 0.3953 At 100 docs 0.2412 At 200 docs 0.1593 At 500 docs 0.0765 At 1000 docs 0.0413 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.4294

Recall Level Precision Averages

Recall Precision 0.00 0.9126 0.10 0.7824 0.20 0.7077 0.30 0.6519 0.40 0.6106 0.50 0.5545 0.60 0.4802 0.70 0.4218 0.80 0.3407 0.90 0.2531 1.00 0.1195 Average precision over all relevant documents non-interpolated 0.5217

Document Level Averages Precision At 5 docs 0.7800 At 10 docs 0.7160 At 15 docs 0.6813 At 20 docs 0.6460 At 30 docs 0.6153 At 100 docs 0.4254 At 200 docs 0.2912 At 500 docs 0.1447 At 1000 docs 0.0792 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.5045

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)