YLMS-J-J-D-02

Summary Statistics Run ID YLMS-J-J-D-02 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 3180 Rel-ret: 2505

Summary Statistics Run ID YLMS-J-J-D-02 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 4764 Rel-ret: 3744

Recall Level Precision Averages

Recall Precision 0.00 0.5861 0.10 0.4188 0.20 0.3764 0.30 0.3385 0.40 0.3122 0.50 0.2860 0.60 0.2604 0.70 0.2326 0.80 0.1893 0.90 0.1322 1.00 0.0618 Average precision over all relevant documents non-interpolated 0.2719

Document Level Averages Precision At 5 docs 0.3520 At 10 docs 0.3460 At 15 docs 0.3373 At 20 docs 0.3250 At 30 docs 0.2953 At 100 docs 0.2136 At 200 docs 0.1601 At 500 docs 0.0889 At 1000 docs 0.0501 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2797

Recall Level Precision Averages

Recall Precision 0.00 0.7314 0.10 0.5574 0.20 0.4886 0.30 0.4460 0.40 0.4030 0.50 0.3604 0.60 0.3195 0.70 0.2793 0.80 0.2200 0.90 0.1509 1.00 0.0560 Average precision over all relevant documents non-interpolated 0.3480

Document Level Averages Precision At 5 docs 0.5200 At 10 docs 0.4900 At 15 docs 0.4813 At 20 docs 0.4690 At 30 docs 0.4280 At 100 docs 0.3144 At 200 docs 0.2370 At 500 docs 0.1320 At 1000 docs 0.0749 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.3577

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)