OKSAT-J-J-D-02

Summary Statistics Run ID OKSAT-J-J-D-02 Task J-J Relevant Level Level1 (S or A) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 48864 Relevant: 3180 Rel-ret: 2138

Summary Statistics Run ID OKSAT-J-J-D-02 Task J-J Relevant Level Level2 (S, A, or B) Method automatic Query Field D Query Type D only Number of Topics 50 Total number of documents over all topics Retrieved: 48864 Relevant: 4764 Rel-ret: 3108

Recall Level Precision Averages

Recall Precision 0.00 0.5564 0.10 0.3567 0.20 0.2790 0.30 0.2384 0.40 0.2079 0.50 0.1670 0.60 0.1278 0.70 0.0984 0.80 0.0790 0.90 0.0451 1.00 0.0094 Average precision over all relevant documents non-interpolated 0.1768

Document Level Averages Precision At 5 docs 0.3280 At 10 docs 0.3040 At 15 docs 0.2760 At 20 docs 0.2630 At 30 docs 0.2413 At 100 docs 0.1756 At 200 docs 0.1278 At 500 docs 0.0705 At 1000 docs 0.0428 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2174

Recall Level Precision Averages

Recall Precision 0.00 0.7108 0.10 0.4557 0.20 0.3643 0.30 0.3125 0.40 0.2640 0.50 0.2056 0.60 0.1592 0.70 0.1221 0.80 0.0940 0.90 0.0521 1.00 0.0117 Average precision over all relevant documents non-interpolated 0.2249

Document Level Averages Precision At 5 docs 0.4760 At 10 docs 0.4360 At 15 docs 0.4093 At 20 docs 0.3900 At 30 docs 0.3593 At 100 docs 0.2540 At 200 docs 0.1844 At 500 docs 0.1024 At 1000 docs 0.0622 R-Precision (precision after R docs retreived (where R is the number of relevant documnets)) Exact 0.2687

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Recall-Precision Curve Difference from Median in Average Precision per Topic (all)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)

Difference from Median in Difference from Median in Average Precision per Topic Average Precision per Topic (automatic) (D only)